Title: Self Learning Unit - Description
Course: Electric Circuit > Section: Self-learning Unit "Resistance and Simple Serial Circuits"

Description of the self-learning unit

Introduction, Overview and time frame

This self-learning unit consists of several activities:

1. Complete the self-evaluating mandala and hand in the document (minimal effort of about two minutes)
2. Introduction lesson “resistance” with video (minimal effort of about two minutes)
3. Work in the virtual laboratory (effort of about twenty minutes, depending on your interest it may take longer)

  - Create an electrical circuit
  - Measure voltage and current strength
  - Create a measurement report

1. Hand in the measurement report and your feedback on the laboratory part with response (effort of about ten minutes)
2. Second mission in the virtual laboratory (effort of about twenty minutes)

  - Construct a series connection
  - Measure under instruction
  - Create a measurement report
  - Hand in the measurement report

1. Feedback on the second laboratory part with response (discussion board, effort of about ten minutes)
2. Digital competence-check (5 minutes)
3. Give feedback on the self-elevating mandala and hand it in (effort of about two minutes)